cluster energy (GeV)

0 10 20 30 40 50 60 70 80 90 100 -1 10

1

10

210

3 10

410

5 10

17/05/2012

cluster energy (GeV)

0 5 10 15 20 25 30 35 40 45 50 number of cells per cluster

0

5 10

15 20

25

30 35

1

10

210

310

410

17/05/2012

η cluster

-0.6 -0.4 -0.2 0 0.2 0.4 0.6 ϕ cluster

1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3

1

10

210

cluster energy (GeV)

0 10 20 30 40 50 60 70 80 90 100 cluster time (ns)

0

20

40

60

80

100

120

140

1

10

210

310

410

17/05/2012