Energy (GeV)

0 1 2 3 4 5 6 7 8 9 10

Matching Efficiency

0

0.5

1 = 7 TeV, statistical uncertainties s pp events at

(V1 HLT) → (V1 offline) (V1 offline) → (V1 HLT) 16/05/2012