\section{Ali\-HLTPHOSRaw\-Analyzer\-Crude\-Component.cxx File Reference}
\label{AliHLTPHOSRawAnalyzerCrudeComponent_8cxx}\index{AliHLTPHOSRawAnalyzerCrudeComponent.cxx@{AliHLTPHOSRawAnalyzerCrudeComponent.cxx}}


{\tt \#include \char`\"{}Ali\-HLTPHOSRaw\-Analyzer\-Crude\-Component.h\char`\"{}}\par
{\tt \#include \char`\"{}Ali\-HLTPHOSRaw\-Analyzer\-Crude.h\char`\"{}}\par
\subsection*{Variables}
\begin{CompactItemize}
\item 
{\bf Ali\-HLTPHOSRaw\-Analyzer\-Crude\-Component} {\bf g\-Ali\-HLTPHOSRaw\-Analyzer\-Crude\-Component}
\end{CompactItemize}


\subsection{Variable Documentation}
\index{AliHLTPHOSRawAnalyzerCrudeComponent.cxx@{Ali\-HLTPHOSRaw\-Analyzer\-Crude\-Component.cxx}!gAliHLTPHOSRawAnalyzerCrudeComponent@{gAliHLTPHOSRawAnalyzerCrudeComponent}}
\index{gAliHLTPHOSRawAnalyzerCrudeComponent@{gAliHLTPHOSRawAnalyzerCrudeComponent}!AliHLTPHOSRawAnalyzerCrudeComponent.cxx@{Ali\-HLTPHOSRaw\-Analyzer\-Crude\-Component.cxx}}
\subsubsection{\setlength{\rightskip}{0pt plus 5cm}{\bf Ali\-HLTPHOSRaw\-Analyzer\-Crude\-Component} {\bf g\-Ali\-HLTPHOSRaw\-Analyzer\-Crude\-Component}}\label{AliHLTPHOSRawAnalyzerCrudeComponent_8cxx_a0}




Definition at line 21 of file Ali\-HLTPHOSRaw\-Analyzer\-Crude\-Component.cxx.