Point with phase aberrations

-0.01 -0.008 -0.006 -0.004 -0.002 0 0.002 0.004 0.006 0.008 0.01

0.022

0.024

0.026

0.028

0.03

0.032

0.034

0.036

0.038

0.04 -50

-45

-40

-35

-30

-25

-20

-15

-10

-5

0