0 2 4 6 8 10 12 14

Z (cm)

-20 -15 -10 -5 0 5 10 15 20

Beam particle pseudorapidity

-4 -3 -2 -1 0 1 2 3 4 Density of Hits for Layer 1_{hzetapden1}

Nent = 641 Mean x = -0.6427 Mean y = -0.05364 RMS x = 6.988 RMS y = 1.287