Z (cm)

-60 -40 -20 0 20 40 60

Number of Hits (cm^{-2)}

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 Density of Hits for Layer 6 hzetapden_z6

Nent = 31 Mean = 2.577 RMS = 28.79