Pseudorapidity

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

Weight (cm^{-2)}

0

20

40

60

80

100

Weight for Layer 1 by Eta_{hEtaEtapdenWeight_Eta1}

Nent = 12399 Mean = 4.584e-17 RMS = 1.05