Pseudorapidity

-1 -0.5 0 0.5 1

Weight (cm^{-2)}

0

2

4

6

8

10

12

Weight for Layer 3 by Eta_{hEtaEtapdenWeight_Eta3}

Nent = 1982 Mean = 1.46e-11 RMS = 0.7158