Z (cm)

-20 -15 -10 -5 0 5 10 15 20

Number of Hits per cm

0 2 4 6 8 10 12 14 16 18 Hits for Layer 1 hzetap_z1

Nent = 641 Mean = -0.6436 RMS = 6.985