Beam particle pseudorapidity

-4 -3 -2 -1 0 1 2 3 4

Number of Hits

0

10

20

30

40

50

60

Hits for Layer 6 hzetap_etap6

Nent = 433 Mean = -0.05127 RMS = 1.291